1 0- 51 0- 41 0- 39 999.299.499.699.81 0 0

KEK_96, Low Power FEEKEK_96, IrradiatedH8_96H8_96, Beam OFF NoiseH8_96, Irradiated

OCCUPANCY in 25nsEFFICIENCY [%]