00.511.522.533.505 01 0 01 5 0

3 0 0

MEDIAN PULSE HEIGHT vs BIAS

ATT8- unirradiatedATT7- irradiated

MEDIAN PULSE HEIGHT [fC]Bias Voltage [V]