ReadOut Occupancy DMax(BL0)

minbias_hil

Entries Mean RMS 1000 23.47 6.322

ReadOut Occupancy DMax(SL0)

Entries Mean RMS 1000 10.20 2.639

ReadOut Occupancy DMax(SL1)

Entries Mean RMS 1000 7.665 1.907

ReadOut Occupancy DMax2(BL0)

Entries Mean RMS 1000 21.11 5.886

ReadOut Occupancy DMax2(SL0)

Entries Mean RMS 1000 8.735 2.346

ReadOut Occupancy DMax2(SL1)

Entries Mean RMS 1000 6.373 1.691

ReadOut Occupancy DAvg(BL0)

Entries Mean RMS 1000 14.46 4.508

ReadOut Occupancy DAvg(SL0)

Entries Mean RMS 1000 4.370 1.392

ReadOut Occupancy DAvg(SL1)

Entries Mean RMS 1000 2.653 0.8511

0

50

0 100 0

100

0 50 0

200

0 50

0

50

0 100 0

200

0 50 0

200

0 50

0

50

0 50 0

25

0 10 0

50

0 10